




         9.0  QUIT TO THE DOS OPERATING SYSTEM             Page  9.0.1
         =============================================================

         Here you exit the CMS system and return to DOS.

         To exit CMS:

         A. Press <Esc> until you are at the "Main" menu.

         B. Press <Q> to select "Quit to DOS", and then <Enter>.

         C. All CMS files will be safely closed and you are returned
            to DOS.



































         =============================================================
         QUITE TO THE DOS OPERATING SYSTEM                 Page  9.0.1